import { useParams } from 'common'
import { AlertCircle, RefreshCw } from 'lucide-react'
import { useEffect } from 'react'
import { toast } from 'sonner'
import { Alert, AlertDescription, AlertTitle, Button, WarningIcon } from 'ui'
import { Admonition } from 'ui-patterns/admonition'

import { DNSRecord } from './DNSRecord'
import { DNSTableHeaders } from './DNSTableHeaders'
import { DocsButton } from '@/components/ui/DocsButton'
import { InlineLink } from '@/components/ui/InlineLink'
import Panel from '@/components/ui/Panel'
import { useProjectSettingsV2Query } from '@/data/config/project-settings-v2-query'
import { useCustomDomainDeleteMutation } from '@/data/custom-domains/custom-domains-delete-mutation'
import { useCustomDomainsQuery } from '@/data/custom-domains/custom-domains-query'
import { useCustomDomainReverifyQuery } from '@/data/custom-domains/custom-domains-reverify-query'
import { DOCS_URL } from '@/lib/constants'

export const CustomDomainVerify = () => {
  const { ref: projectRef } = useParams()

  const { data: settings } = useProjectSettingsV2Query({ projectRef })

  const { data: customDomainData } = useCustomDomainsQuery({ projectRef })
  const customDomain = customDomainData?.customDomain
  const isSSLCertificateDeploying =
    customDomain?.ssl.status !== undefined && customDomain.ssl.txt_name === undefined

  const { mutate: deleteCustomDomain, isPending: isDeleting } = useCustomDomainDeleteMutation({
    onSuccess: () => {
      toast.success(
        'Custom domain setup cancelled successfully. It may take a few seconds before your custom domain is fully removed, so you may need to refresh your browser.'
      )
    },
  })

  const {
    data: reverifyData,
    refetch: refetchReverify,
    isFetching: isReverifyLoading,
    isError: isReverifyError,
    error: reverifyError,
  } = useCustomDomainReverifyQuery(
    { projectRef },
    {
      // Poll every 10 seconds if the SSL certificate is being deployed
      refetchInterval: isSSLCertificateDeploying && !isDeleting ? 10000 : false,
    }
  )

  useEffect(() => {
    if (isReverifyError) {
      toast.error(reverifyError?.message)
    }
  }, [isReverifyError, reverifyError])

  const isNotVerifiedYet = reverifyData?.status === '2_initiated'

  const hasCAAErrors = customDomain?.ssl.validation_errors?.reduce(
    (acc, error) => acc || error.message.includes('caa_error'),
    false
  )
  const isValidating = (customDomain?.ssl.txt_name ?? '') === ''

  const onReverifyCustomDomain = () => {
    if (!projectRef) return console.error('Project ref is required')
    refetchReverify()
  }

  const onCancelCustomDomain = async () => {
    if (!projectRef) return console.error('Project ref is required')
    deleteCustomDomain({ projectRef })
  }

  return (
    <>
      <Panel.Content className="space-y-6">
        <div>
          <h4 className="text-foreground mb-2">
            Configure TXT verification for your custom domain{' '}
            <code className="text-code-inline">{customDomain?.hostname}</code>
          </h4>
          <p className="text-sm text-foreground-light">
            Set the following TXT record(s) in your DNS provider, then click verify to confirm your
            control over the domain. Records which have been successfully verified will be removed
            from this list below.
          </p>
          {!isValidating && (
            <div className="mt-4 mb-2">
              <Admonition
                type="note"
                title={
                  isNotVerifiedYet
                    ? 'Unable to verify records from DNS provider yet.'
                    : 'Please note that it may take up to 24 hours for the DNS records to propagate.'
                }
              >
                <p>
                  You may also visit{' '}
                  <InlineLink href={`https://whatsmydns.net/#TXT/${customDomain?.ssl.txt_name}`}>
                    here
                  </InlineLink>{' '}
                  to check if your DNS has been propagated successfully before clicking verify.
                </p>
                {isNotVerifiedYet && (
                  <p className="mt-1">
                    Some registrars will require you to remove the domain name when creating DNS
                    records. As an example, to create a record for{' '}
                    <code className="text-code-inline">foo.app.example.com</code>, you would need to
                    create an entry for <code className="text-code-inline">foo.app</code>.
                  </p>
                )}
              </Admonition>
            </div>
          )}
        </div>

        {hasCAAErrors && (
          <Alert>
            <WarningIcon />
            <AlertTitle>Certificate Authority Authentication (CAA) error</AlertTitle>
            <AlertDescription>
              Please add a CAA record allowing "digicert.com" to issue certificates for{' '}
              <code className="text-code-inline">{customDomain?.hostname}</code>. For example:{' '}
              <code className="text-code-inline">0 issue "digicert.com"</code>
            </AlertDescription>
          </Alert>
        )}

        {customDomain?.ssl.status === 'validation_timed_out' ? (
          <Alert>
            <WarningIcon />
            <AlertTitle>Validation timed out</AlertTitle>
            <AlertDescription>
              Please click "Verify" again to retry the validation of the records
            </AlertDescription>
          </Alert>
        ) : (
          <div className="space-y-2">
            <DNSTableHeaders display={customDomain?.ssl.txt_name ?? ''} />

            {customDomain?.verification_errors?.includes(
              'custom hostname does not CNAME to this zone.'
            ) && (
              <DNSRecord
                type="CNAME"
                name={customDomain?.hostname}
                value={settings?.app_config?.endpoint ?? 'Loading...'}
              />
            )}

            {!isValidating && customDomain?.ssl.status === 'pending_validation' && (
              <DNSRecord
                type="TXT"
                name={customDomain?.ssl.txt_name ?? 'Loading...'}
                value={customDomain?.ssl.txt_value ?? 'Loading...'}
              />
            )}

            {customDomain?.ssl.status === 'pending_deployment' && (
              <div className="flex items-center justify-center space-x-2 py-8">
                <AlertCircle size={16} strokeWidth={1.5} />
                <p className="text-sm text-foreground-light">
                  SSL certificate is being deployed. Please wait a few minutes and try again.
                </p>
              </div>
            )}
          </div>
        )}
      </Panel.Content>

      <div className="border-t border-muted" />

      <Panel.Content>
        <div className="flex items-center justify-between">
          <DocsButton href={`${DOCS_URL}/guides/platform/custom-domains`} />
          <div className="flex items-center space-x-2">
            <Button
              type="default"
              onClick={onCancelCustomDomain}
              loading={isDeleting}
              className="self-end"
            >
              Cancel
            </Button>
            <Button
              icon={<RefreshCw />}
              onClick={onReverifyCustomDomain}
              loading={!isValidating && isReverifyLoading}
              disabled={isDeleting || isReverifyLoading || isValidating}
              className="self-end"
            >
              Verify
            </Button>
          </div>
        </div>
      </Panel.Content>
    </>
  )
}
